0

10

(mm)

89 90 91 92 93 94 -10

0

DIOC North rate(mm/yr)= -25.6_+ 0.7 nrms= 1.17 wrms= 3.3

(mm)

-10

0

10

89 90 91 92 93 94

0

DIOC East rate(mm/yr)= -15.3_+ 1.1 nrms= 0.68 wrms= 2.2

-10

0

10

(mm)

91 92 93 94 95 96 97 98

ZELB North rate(mm/yr)= 0.7_+ 0.4 nrms= 2.30 wrms= 2.5

-10

10

91 92 93 94 95 96 97 98

0

(mm)

ZELB East rate(mm/yr)= 0.7_+ 0.6 nrms= 1.00 wrms= 1.5

-10

0

10

92 93 94 95 96 97

0

(mm)

ANKA North rate(mm/yr)= -1.9_+ 0.8 nrms= 1.10 wrms= 2.2

-10

0

10

(mm)

92 93 94 95 96 97

0

ANKA East rate(mm/yr)= -20.4_+ 0.8 nrms= 0.13 wrms= 0.2

-10

0

10

96 97 98 99

0

(mm)

ANKR North rate(mm/yr)= -1.1_+ 0.2 nrms= 1.13 wrms= 1.7

-10

0

10

96 97 98 99

0

(mm)

ANKR East rate(mm/yr)= -20.0_+ 0.4 nrms= 0.91 wrms= 2.4